(rad) Chθ Cherenkov angle,

0.56 0.58 0.6 0.62 0.64 0.66 0.68 0.7 0.72 0.74

Entries/mrad

0 20 40 60 80 100 120 140 160 = 2.76 TeV s ALICE pp at c < 2.7 GeV/ Tp < c 2.6 GeV/

+π_+ K p